INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (1, 'siteName', '站点名称');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (5, 'storageStrategy', '当前启用存储引擎');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (6, 'username', '管理员账号');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (7, 'password', '管理员密码');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (8, 'domain', '站点域名');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (11, 'customCss', '自定义 CSS');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (12, 'customJs', '自定义 JS (可用于统计代码)');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (13, 'tableSize', '表格大小', 'mini');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (14, 'showOperator', '是否显示操作按钮', 'true');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (15, 'showDocument', '是否显示文档', 'true');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`) VALUES (16, 'announcement', '网站公告');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (17, 'showAnnouncement', '是否显示网站公告', 'true');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (18, 'layout', '页面布局', 'full');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (19, 'showLinkBtn', '是否显示生成直链按钮', 'true');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (20, 'showShortLink', '是否显示短链', 'true');
INSERT INTO SYSTEM_CONFIG (`ID`, `k`, `REMARK`, `value`) VALUES (21, 'showPathLink', '是否显示路径直链', 'true');
alter table short_link change "key" key varchar(255) null;